line126

B - ESO 2.2m/WIFI

127127127 126126126126

125125125125

124124

g - C.A. 3.5m/LAICA

127127127 126126126126

125125125125

124124

17127

17119

17115

17080

17079

16950

16858

16789

16788i - C.A. 3.5m/LAICA

127127127 126126126126

125125125125

124124

z - C.A. 3.5m/LAICA

127127127 126126126126

125125125125

124124

K - C.A 3.5m/O-Prime

127127127 126126126126

125125125125

124124