line121

B - ESO 2.2m/WIFI

121121

118118118118118118

g - C.A. 3.5m/LAICA

121121

118118118118118118

16156

16111

16110

16072

16067

15974

15969

15961

15953

15903

15835

15834

15833

15832

15811

15772i - C.A. 3.5m/LAICA

121121

118118118118118118

z - C.A. 3.5m/LAICA

121121

118118118118118118

K - C.A 3.5m/O-Prime

121121

118118118118118118