line086

B - ESO 2.2m/WIFI

86

g - C.A. 3.5m/LAICA

14316

14273

14225

14199

14107

14106

14008i - C.A. 3.5m/LAICA

86

z - C.A. 3.5m/LAICA

86

K - C.A 3.5m/O-Prime

86