line083

B - ESO 2.2m/WIFI

8383

g - C.A. 3.5m/LAICA

8383

12776

12479

12478

12477

12476

12470

12405

12362i - C.A. 3.5m/LAICA

8383

z - C.A. 3.5m/LAICA

8383

K - C.A 3.5m/O-Prime

8383