line024

B - ESO 2.2m/WIFI

242424

g - C.A. 3.5m/LAICA

242424

11891

11824

11576

11575

11484

11466i - C.A. 3.5m/LAICA

242424

z - C.A. 3.5m/LAICA

242424

K - C.A 3.5m/O-Prime

242424