1000

2000

3000

4000

5000

-0.10.00.1

Group #4 / Instrument P1: Internal photometric error AXIS1 [pixels]

Δmag

AXIS2 [pixels]

-0.2-0.10.00.10.2

Group #4 / Instrument P2: Internal photometric error

No overlapping detections!

1000

2000

3000

4000

5000

-1.0-0.50.00.51.0

Group #4 / Instrument P3: Internal photometric error

AXIS1 [pixels]

Δmag

AXIS2 [pixels]

No overlapping detections!

1000

2000

3000

4000

5000

-1.0-0.50.00.51.0

Group #4 / Instrument P4: Internal photometric error AXIS1 [pixels]

Δmag

AXIS2 [pixels]